Scalable Real-time Parallel Garbage Collection for Symmetric Multiprocessors

Perry Sze-Din Cheng

September 2001 CMU-CS-01-174

School of Computer Science Carnegie Mellon University Pittsburgh, PA 15213

Submitted in partial fulfillment of the requirements for the degree of Doctor of Philosophy

Thesis Committee

Guy Blelloch (Co-chair) Robert Harper (Co-chair) Peter Lee Urs Hoelzle, University of California Santa Barbara

Copyright© Perry Cheng 2001

The views and conclusions contained in this document are those of the author and should not be interpreted as representing the official policies, either expressed or implied, of any sponsoring organization.